  0

 .4

 .8

1.2

             1400.5 1401.0 1401.5 1402.0

  0

 .4

 .8

1.2

   1402.0 1402.5 1403.0 1403.5

  0

 .4

 .8

1.2

       1404.0 1404.5 1405.0 1405.5

Flux

                            Wavelength

  0

 .4

 .8

1.2

           1406.0 1406.5 1407.0 1407.5

  0

 .4

 .8

1.2

               1408.0 1408.5 1409.0

  0

 .4

 .8

1.2

     1409.5 1410.0 1410.5 1411.0

  0

 .4

 .8

1.2

         1411.5 1412.0 1412.5 1413.0

Flux

                            Wavelength

  0

 .4

 .8

1.2

             1413.5 1414.0 1414.5 1415.0