  0

 .4

 .8

1.2

     1409.5 1410.0 1410.5 1411.0

  0

 .4

 .8

1.2

         1411.5 1412.0 1412.5 1413.0

Flux

                            Wavelength

                         Z2MB010H.obsdat

  0

 .4

 .8

1.2

             1413.5 1414.0 1414.5 1415.0

Flux

                            Wavelength

  0

 .4

 .8

1.2

   1415.0 1415.5 1416.0 1416.5