Flux

                                                       Wavelength

                                              Tau Sco  CASPEC 1985  merged

  0

 .1

 .2

 .3

 .4

 .5

 .6

 .7

 .8

 .9

1.0

1.1

1.2

    3900 3910 3920 3930 3940 3950 3960 3970 3980 3990 4000

Flux

                                                       Wavelength

                                              Tau Sco  CASPEC 1985  merged

  0

 .1

 .2

 .3

 .4

 .5

 .6

 .7

 .8

 .9

1.0

1.1

1.2

    4000 4010 4020 4030 4040 4050 4060 4070 4080 4090 4100

Flux

                                                       Wavelength

                                              Tau Sco  CASPEC 1985  merged

  0

 .1

 .2

 .3

 .4

 .5

 .6

 .7

 .8

 .9

1.0

1.1

1.2

    4100 4110 4120 4130 4140 4150 4160 4170 4180 4190 4200

Flux

                                                       Wavelength

                                              Tau Sco  CASPEC 1985  merged

  0

 .1

 .2

 .3

 .4

 .5

 .6

 .7

 .8

 .9

1.0

1.1

1.2

    4200 4210 4220 4230 4240 4250 4260 4270 4280 4290 4300

Flux

                                                       Wavelength

                                              Tau Sco  CASPEC 1985  merged

  0

 .1

 .2

 .3

 .4

 .5

 .6

 .7

 .8

 .9

1.0

1.1

1.2

    4300 4310 4320 4330 4340 4350 4360 4370 4380 4390 4400

Flux

                                                       Wavelength

                                              Tau Sco  CASPEC 1985  merged

  0

 .1

 .2

 .3

 .4

 .5

 .6

 .7

 .8

 .9

1.0

1.1

1.2

    4400 4410 4420 4430 4440 4450 4460 4470 4480 4490 4500

Flux

                                                       Wavelength

                                              Tau Sco  CASPEC 1985  merged

  0

 .1

 .2

 .3

 .4

 .5

 .6

 .7

 .8

 .9

1.0

1.1

1.2

    4500 4510 4520 4530 4540 4550 4560 4570 4580 4590 4600

Flux

                                                       Wavelength

                                              Tau Sco  CASPEC 1985  merged

  0

 .1

 .2

 .3

 .4

 .5

 .6

 .7

 .8

 .9

1.0

1.1

1.2

    4600 4610 4620 4630 4640 4650 4660 4670 4680 4690 4700

Flux

                                                       Wavelength

                                              Tau Sco  CASPEC 1985  merged

  0

 .1

 .2

 .3

 .4

 .5

 .6

 .7

 .8

 .9

1.0

1.1

1.2

    4700 4710 4720 4730 4740 4750 4760 4770 4780 4790 4800

Flux

                                                       Wavelength

                                              Tau Sco  CASPEC 1985  merged

  0

 .1

 .2

 .3

 .4

 .5

 .6

 .7

 .8

 .9

1.0

1.1

1.2

    4800 4810 4820 4830 4840 4850 4860 4870 4880 4890 4900

Flux

                                                       Wavelength

                                              Tau Sco  CASPEC 1985  merged

  0

 .1

 .2

 .3

 .4

 .5

 .6

 .7

 .8

 .9

1.0

1.1

1.2

    4900 4910 4920 4930 4940 4950 4960 4970 4980 4990 5000